200.8 201 201.2 201.4 201.6

2445

2450

2455

2460

2465

2470

2475

2480

2485

18JUL19XE_N004 (r4851): FORTLEZA

Zenith Total Delay [mm]

Day of 2018 cgs iaa IVS