134.8 135 135.2 135.4 135.6

2405

2410

2415

2420

2425

2430

2435

2440

2445

2450

2455

18MAY14XA_N004 (r1842): WARK12M

Zenith Total Delay [mm]

Day of 2018 cgs IVS