86.8 87 87.2 87.4 87.6

2620

2640

2660

2680

2700

2720

2740

2760

2780

2800

18MAR27XE\_N004 (r4835): FORTLEZA

Zenith Total Delay [mm]

Day of 2018 bkg cgs iaa IVS