75.8 76 76.2 76.4 76.6

2425

2430

2435

2440

2445

2450

2455

2460

2465

2470

2475

17MAR16XE_N004 (r4783): WARK12M

Zenith Total Delay [mm]

Day of 2017 bkg cgs iaa igg IVS