340.8 341 341.2 341.4 341.6

2060

2080

2100

2120

2140

2160

2180

2200

16DEC05XA_N004 (r1769): HART15M

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf iaa IVS