172.8 173 173.2 173.4 173.6

2305

2310

2315

2320

2325

2330

2335

2340

2345

2350

2355

16JUN20XA_N004 (r1745): NYALES20

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf iaa igg IVS