12.8 13 13.2 13.4 13.6

2400

2410

2420

2430

2440

2450

2460

2470

2480

2490

2500

16JAN12XA_N004 (r1722): HOBART12

Zenith Total Delay [mm]

Day of 2016 bkg cgs dgf iaa igg IVS