364.8 365 365.2 365.4 365.6 600 800 1000

1200

1400

1600

1800

2000

2200

14DEC30XE_N004 (r4668): NYALES20

Zenith Total Delay [mm]

Day of 2014 bkg cgs dgf igg IVS