212.8 213 213.2 213.4 213.6

2460

2465

2470

2475

2480

2485

2490

2495

2500

2505

2510

14JUL31XE_N004 (r4646): KATH12M

Zenith Total Delay [mm]

Day of 2014 bkg cgs iaa igg IVS