255.8 256 256.2 256.4 256.6

2310

2320

2330

2340

2350

2360

2370

2380

2390

13SEP12XE_N004 (r4602): NYALES20

Zenith Total Delay [mm]

Day of 2013 bkg cgs dgf iaa ina IVS