208.8 209 209.2 209.4 209.6

2170

2180

2190

2200

2210

2220

2230

2240

2250

2260

12JUL26XE_N004 (r4543): YEBES40M

Zenith Total Delay [mm]

Day of 2012 bkg cgs dgf iaa ina mao IVS