142.8 143 143.2 143.4 143.6

2210

2220

2230

2240

2250

2260

2270

2280

2290

2300

2310

12MAY21XA_N006 (r1534): WETTZELL

Zenith Total Delay [mm]

Day of 2012 bkg dgf iaa ina mao IVS