151.8 152 152.2 152.4 152.6

2440

2460

2480

2500

2520

2540

2560

2580

11MAY31XA_N007 (r1485): FORTLEZA

Zenith Total Delay [mm]

Day of 2011 bkg cgs dgf iaa ina