81.8 82 82.2 82.4 82.6

2380

2390

2400

2410

2420

2430

2440

10MAR22XA_N004 (r1423): WESTFORD

Zenith Total Delay [mm]

Day of 2010 bkg cgs dgf iaa ina mao IVS