49.8 50 50.2 50.4 50.6

1940

1960

1980

2000

2020

2040

2060

2080

2100

10FEB18XE_N004 (r4418): KOKEE

Zenith Total Delay [mm]

Day of 2010 bkg cgs dgf gsf iaa ina mao IVS