215.8 216 216.2 216.4 216.6

2430

2440

2450

2460

2470

2480

2490

2500

2510

2520

09AUG03XA_N004 (r1390): SVETLOE

Zenith Total Delay [mm]

Day of 2009 bkg cgs dgf gsf iaa mao IVS