231 231.2 231.4 231.6 231.8 232

2000

2010

2020

2030

2040

2050

2060

2070

2080

2090

08AUG18XA_N004 (c0807): HARTRAO

Zenith Total Delay [mm]

Day of 2008 bkg cgs gsf iaa mao IVS