213.8 214 214.2 214.4 214.6

2300

2400

2500

2600

2700

2800

08JUL31XE_N004 (r4339): SVETLOE

Zenith Total Delay [mm]

Day of 2008 bkg cgs dgf gsf igg mao IVS