325.8 326 326.2 326.4 326.6

2100

2200

2300

2400

2500

2600

2700

2800

06NOV21XE_N004 (r4251): WETTZELL

Zenith Total Delay [mm]

Day of 2006 bkg cgs dgf iaa igg mao oso IVS