275.8 276 276.2 276.4 276.6

2320

2330

2340

2350

2360

2370

2380

2390

2400

2410

06OCT02XA_N004 (r1244): ONSALA60

Zenith Total Delay [mm]

Day of 2006 bkg cgs dgf iaa igg mao oso IVS