302.8 303 303.2 303.4 303.6

2275

2280

2285

2290

2295

2300

2305

2310

04OCT28XE_N004 (r4145): NYALES20

Zenith Total Delay [mm]

Day of 2004 bkg cgs cnr dgf gsf iaa igg mao oso IVS