7645 7650 7655 7660 7665 7670 7675 7680

2305

2310

2315

2320

2325

2330

2335

2340

2345

2350

2355

combined VLBI tzd at NYAL for week 1192

hours in 02 mm

IGG BKG CNR CGS IAA GSF OSO IVS