3040 3050 3060 3070 3080 3090 3100 3110 3120 3130 3140

2240

2260

2280

2300

2320

2340

2360

combined VLBI tzd at MATE for week 1165

hours in 02 mm

IGG BKG CNR IAA GSF IVS