1600 1605 1610 1615 1620 1625 1630

2620

2630

2640

2650

2660

2670

2680

2690

2700

2710

2720

combined VLBI tzd at FORT for week 1156

hours in 02 mm

IGG BKG CNR IAA GSF IVS