1020 1040 1060 1080 1100 1120 1140

2220

2225

2230

2235

2240

2245

2250

2255

2260

2265

2270

combined VLBI tzd at NYAL for week 1153

hours in 02 mm

IGG BKG CNR IAA GSF IVS